h1. SuperCollider 3 Unit Generators

h3. SwitchDelay

feedback delay line implementing switch-and-ramp technique. Seeks to avoid unwanted artefacts when switching the buffer read position/delay time.<br/>
"example - mp3":http://rfwatson.github.com/switchdelay.mp3 (832k)

h3. XCut

select one from an array of signals, when index changed ramps smoothly between old and new signals

h3. AverageOutput 

calculates mean average of audio or control rate signal.
<br/><br/>

*Released under the GNU General Public License.*

************************************************************************

	  SuperCollider real time audio synthesis system
    Copyright (c) 2002 James McCartney. All rights reserved.
	  http://www.audiosynth.com

    This program is free software; you can redistribute it and/or modify
    it under the terms of the GNU General Public License as published by
    the Free Software Foundation; either version 2 of the License, or
    (at your option) any later version.

    This program is distributed in the hope that it will be useful,
    but WITHOUT ANY WARRANTY; without even the implied warranty of
    MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
    GNU General Public License for more details.

    You should have received a copy of the GNU General Public License
    along with this program; if not, write to the Free Software
    Foundation, Inc., 59 Temple Place, Suite 330, Boston, MA  02111-1307 
    USA

************************************************************************